
TY  - JOUR
PY  - 1993//
TI  - Minerva
JO  - British medical journal international edition
SP  - e274
EP  - e274
VL  - 307
IS  - 6898
N2  - <p>[Abstract unavailable]</p> <p>Language: en</p>
LA  - en
SN  - 0959-8146
UR  - http://dx.doi.org/
ID  - ref1
ER  -