TY - JOUR PY - 2019// TI - Validity of the CES-D for depression screening in military service members with a history of mild traumatic brain injury JO - Brain injury A1 - Kennedy, J. E. A1 - Reid, M. W. A1 - Lu, L. H. A1 - Cooper, D. B. SP - 932 EP - 940 VL - 33 IS - 7 N2 - PRIMARY OBJECTIVE: To advance knowledge about the value of the Center for Epidemiologic Studies - Depression scale (CES-D) for depression screening in military service members with a history of mild traumatic brain injury (mTBI). RESEARCH DESIGN: Retrospective data from 336 military service members with a history of mTBI were extracted from a TBI Repository at a large military medical center. Participants included in this study screened positive for mTBI in a primary care clinic or soldier readiness processing center and were enrolled in the TBI repository from November 6, 2014 to May 31, 2017. At the time of enrollment, participants completed the CES-D and their electronic medical records (EMR) were searched for diagnoses of depressive disorders.

METHODS AND PROCEDURES: Receiver-operating characteristic (ROC) analysis of the CES-D was used to discriminate cases with and without depression diagnoses. MAIN OUTCOMES AND RESULTS: Area under the ROC curve (AUC) was.897. Sensitivity (.824) and specificity (.826) were maximized at a cut score of 18 or greater, slightly higher than the standard cut of 16 established for civilian samples.

CONCLUSIONS: Results suggest that the CES-D is a valid screening instrument for depressive disorders in military samples with a history of mTBI.

Language: en

LA - en SN - 0269-9052 UR - http://dx.doi.org/10.1080/02699052.2019.1610191 ID - ref1 ER -